Pedestals Calib 8556.1

-1

0

1

260 280 300 320 Hut 2.3.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.9

HI gain 0.0 LO gain 0.0

0 25 50

300 350 400 Hut 2.3.10

HI gain 395.4 LO gain 330.9

-1

0

1

260 280 300 320

Hut 2.3.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.12

HI gain 0.0 LO gain 0.0

Pedestals Calib 8556.1

-1

0

1

260 280 300 320

Hut 2.3.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.9

HI gain 0.0 LO gain 0.0

0

50

400 450 500 Hut 2.4.10

HI gain 461.1 LO gain 412.8

Pedestals Calib 8556.1

-1

0

1

260 280 300 320

Hut 2.4.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.12

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.4.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.4

HI gain 0.0 LO gain 0.0

0

50

100

255 260 265 270 Hut 2.5.5

HI gain 0.0 LO gain 397.2

0

50

260 270 Hut 2.5.6

HI gain 0.0 LO gain 404.7

0

50

100

260 270 280 290 Hut 2.5.7

HI gain 0.0 LO gain 444.1

0

50

100

260 270 280 Hut 2.5.8

HI gain 0.0 LO gain 428.6

Pedestals Calib 8556.1

0 10 20

255 260

Hut 2.5.9

HI gain 0.0 LO gain 377.5

0

50

350 400 450 Hut 2.5.10

HI gain 416.3 LO gain 378.5

0 50 100

260 280 300 320 Hut 2.6.3

HI gain 0.0 LO gain 493.3

0

50

100

260 270 Hut 2.6.4

HI gain 0.0 LO gain 403.7

0

50

100

260 280 300 320 Hut 2.6.5

HI gain 0.0 LO gain 527.2

0

50

100

260 280 300 Hut 2.6.6

HI gain 0.0 LO gain 485.9

0 50 100

251 252 253 254 255 Hut 2.6.7

HI gain 0.0 LO gain 360.5

0

50

100

260 270 280 290 Hut 2.6.8

HI gain 0.0 LO gain 438.5

0 50 100

260 270 280 Hut 2.6.9

HI gain 0.0 LO gain 410.3

0

50

100

350 400 450 Hut 2.6.10

HI gain 391.7 LO gain 377.7

Pedestals Calib 8556.1

-1

0

1

260 280 300 320

Hut 2.6.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.6.14

HI gain 0.0 LO gain 0.0

0 50 100

255 260 Hut 2.7.3

HI gain 0.0 LO gain 376.0

0

50

100

260 270 280 Hut 2.7.4

HI gain 0.0 LO gain 418.7

0

50

100

260 270 280 Hut 2.7.5

HI gain 0.0 LO gain 426.6

0

50

100

260 270 280 290 Hut 2.7.6

HI gain 0.0 LO gain 432.8

0 25 50

252 254 256 258 Hut 2.7.7

HI gain 0.0 LO gain 366.0

0

50

260 280 300 Hut 2.7.8

HI gain 0.0 LO gain 474.2

0

50

260 270 Hut 2.7.9

HI gain 0.0 LO gain 403.3

0

50

100

400 450 500 Hut 2.7.10

HI gain 401.9 LO gain 452.9

Pedestals Calib 8556.1

-1

0

1

260 280 300 320

Hut 2.7.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.7.14

HI gain 0.0 LO gain 0.0

0

50

100

255 260 265 270 Hut 2.8.3

HI gain 0.0 LO gain 395.8

0

50

260 270 280 Hut 2.8.4

HI gain 0.0 LO gain 411.6

0

50

260 280 300 320 Hut 2.8.5

HI gain 0.0 LO gain 493.8

0

50

260 270 280 290 Hut 2.8.6

HI gain 0.0 LO gain 447.7

0

50

260 280 300

Hut 2.8.7

HI gain 0.0 LO gain 470.3

0 25 50

260 270 280 Hut 2.8.8

HI gain 0.0 LO gain 424.7

0

50

260 280 300 320 340 Hut 2.8.9

HI gain 0.0 LO gain 544.3

0

50

100

450 500 550 Hut 2.8.10

HI gain 475.4 LO gain 502.9

Pedestals Calib 8556.1

0 25 50

260 270 280 290 Hut 2.9.3

HI gain 0.0 LO gain 438.0

0

50

260 280 300 Hut 2.9.4

HI gain 0.0 LO gain 488.5

0

50

252 254 256 258

Hut 2.9.5

HI gain 0.0 LO gain 368.6

0 25 50

260 280 300 Hut 2.9.6

HI gain 0.0 LO gain 476.7

0 25 50

255 260 265

Hut 2.9.7

HI gain 0.0 LO gain 388.8

0

50

260 270 280 Hut 2.9.8

HI gain 0.0 LO gain 419.0

0 25 50

350 400 450 Hut 2.9.9

HI gain 415.3 LO gain 344.8

0

50

350 400 450 Hut 2.10.4

HI gain 363.8 LO gain 434.0

0

50

450 500 550 Hut 2.10.5

HI gain 443.3 LO gain 520.5

0

50

400 450 500 Hut 2.10.6

HI gain 433.7 LO gain 444.2

Pedestals Calib 8556.1

0

50

100

350 400 450 Hut 2.10.7

HI gain 429.2 LO gain 416.5

0

50

100

350 400 450 Hut 2.10.8

HI gain 433.5 LO gain 375.7

0

50

100

400 450 500 Hut 2.10.9

HI gain 472.1 LO gain 460.0

0 25 50

300 350 400 Hut 2.11.3

HI gain 348.8 LO gain 387.9

0 25 50

400 450 500

Hut 2.11.4

HI gain 427.0 LO gain 478.3

0 25 50

300 350 400 Hut 2.11.5

HI gain 425.4 LO gain 253.5

0

50

400 450 500 Hut 2.11.6

HI gain 463.5 LO gain 416.7

-1

0

1

260 280 300 320 Hut 2.11.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.11.8

HI gain 0.0 LO gain 0.0

0 25 50

300 350 400 Hut 2.12.3

HI gain 387.6 LO gain 350.7

Pedestals Calib 8556.1

0 20 40

450 500 550 Hut 2.12.4

HI gain 470.1 LO gain 509.9

0 25 50

350 400 450 500 Hut 2.12.5

HI gain 389.9 LO gain 459.1

0 25 50

350 400 450

Hut 2.12.6

HI gain 400.5 LO gain 399.2

0

50

260 270 280 Hut 2.12.7

HI gain 0.0 LO gain 415.0

-1

0

1

260 280 300 320

Hut 2.12.8

HI gain 0.0 LO gain 0.0

0

50

400 450 500 Hut 2.13.3

HI gain 389.1 LO gain 539.5

0

50

450 500 550 Hut 2.13.4

HI gain 448.1 LO gain 537.6

0

50

450 500 550 Hut 2.13.5

HI gain 418.8 LO gain 532.7

0 50 100

400 450 500 Hut 2.13.6

HI gain 348.8 LO gain 505.0

0

50

300 350 400 Hut 2.13.7

HI gain 397.5 LO gain 340.7

Pedestals Calib 8556.1

0

50

100

350 400 450 Hut 2.13.8

HI gain 415.6 LO gain 432.6

0

50

350 400 450 Hut 2.14.3

HI gain 361.9 LO gain 421.4

0 25 50

400 450 500 Hut 2.14.4

HI gain 482.9 LO gain 460.5

0 25 50

300 350 400 Hut 2.14.5

HI gain 276.3 LO gain 396.4

0

20

40

400 450 500 Hut 2.14.6

HI gain 502.7 LO gain 427.0

0

50

300 350 400 Hut 2.14.7

HI gain 328.9 LO gain 394.4

0

50

350 400 450 Hut 2.14.8

HI gain 367.2 LO gain 391.0

LP calibrations Calib 8556.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1087. 106.6

Hut 2.3.3 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1087. 106.6

Hut 2.3.3

Hut 2.3.3 TDC counts

Events

HImean = 3464.2 LOmean = 3427.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1339. 5.024

Hut 2.3.4 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1339. 5.024

Hut 2.3.4

Hut 2.3.4 TDC counts

Events

HImean = 3602.5 LOmean = 3653.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1077. 106.8

Hut 2.3.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1077. 106.8

Hut 2.3.5

Hut 2.3.5 TDC counts

Events

HImean = 3666.5 LOmean = 3594.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1070. 151.6

Hut 2.3.6 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1070. 151.6

Hut 2.3.6

Hut 2.3.6 TDC counts

Events

HImean = 3542.4 LOmean = 3065.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1018. 109.6

Hut 2.3.7 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1018. 109.6

Hut 2.3.7

Hut 2.3.7 TDC counts

Events

HImean = 3404.6 LOmean = 3145.7

LP calibrations Calib 8556.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1156. 107.4

Hut 2.3.8 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1156. 107.4

Hut 2.3.8

Hut 2.3.8 TDC counts

Events

HImean = 3644.7 LOmean = 3353.2

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1560. 129.8

Hut 2.3.9 TDC counts

Events

0 50 100

1550 1600 1650

Entries Mean RMS 800 1560. 129.8

Hut 2.3.9

Hut 2.3.9 TDC counts

Events

HImean = 3358.6 LOmean = 3375.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2235. 103.5

Hut 2.3.10 TDC counts

Events

0

100

2200 2250 2300

Entries Mean RMS 800 2235. 103.5

Hut 2.3.10

Hut 2.3.10 TDC counts

Events

HImean = 1229.8 LOmean = 1185.4

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4063. 318.3

Hut 2.3.11 TDC counts

Events

0

500

4020 4040 4060 4080 4100

Entries Mean RMS 800 4063. 318.3

Hut 2.3.11

Hut 2.3.11 TDC counts

Events

HImean = 2620.3 LOmean = 2553.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 956.2 9.265

Hut 2.3.12 TDC counts

Events

0

100

200

950 1000 1050

Entries Mean RMS 800 956.2 9.265

Hut 2.3.12

Hut 2.3.12 TDC counts

Events

HImean = 4078.2 LOmean = 3145.4

LP calibrations Calib 8556.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 726.8 169.1

Hut 2.3.13 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 726.8 169.1

Hut 2.3.13

Hut 2.3.13 TDC counts

Events

HImean = 3148.1 LOmean = 2606.5

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 827.5 2.457

Hut 2.3.14 TDC counts

Events

0 50 100

800 850 900

Entries Mean RMS 800 827.5 2.457

Hut 2.3.14

Hut 2.3.14 TDC counts

Events

HImean = 3808.8 LOmean = 2776.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1140. 104.6

Hut 2.4.3 TDC counts

Events

0

100

1100 1150 1200 1250

Entries Mean RMS 800 1140. 104.6

Hut 2.4.3

Hut 2.4.3 TDC counts

Events

HImean = 3256.9 LOmean = 3424.4

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1444. 2.664

Hut 2.4.4 TDC counts

Events

0 50 100

1400 1450 1500

Entries Mean RMS 800 1444. 2.664

Hut 2.4.4

Hut 2.4.4 TDC counts

Events

HImean = 3491.6 LOmean = 3484.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1359. 137.0

Hut 2.4.5 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1359. 137.0

Hut 2.4.5

Hut 2.4.5 TDC counts

Events

HImean = 3643.8 LOmean = 3515.4

LP calibrations Calib 8556.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6

Hut 2.4.6 TDC counts

Events

HImean = 2590.2 LOmean = 2559.9

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7

Hut 2.4.7 TDC counts

Events

HImean = 2501.6 LOmean = 2564.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1046. 153.2

Hut 2.4.8 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1046. 153.2

Hut 2.4.8

Hut 2.4.8 TDC counts

Events

HImean = 3343.2 LOmean = 3625.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1056. 3.275

Hut 2.4.9 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1056. 3.275

Hut 2.4.9

Hut 2.4.9 TDC counts

Events

HImean = 4002.9 LOmean = 3645.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 737.2 238.3

Hut 2.4.10 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 737.2 238.3

Hut 2.4.10

Hut 2.4.10 TDC counts

Events

HImean = 1114.4 LOmean = 1414.2

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 665.3 11.15

Hut 2.4.11 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 665.3 11.15

Hut 2.4.11

Hut 2.4.11 TDC counts

Events

HImean = 2754.3 LOmean = 2612.7

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4082. 205.5

Hut 2.4.12 TDC counts

Events

0

500

4020 4040 4060 4080 4100

Entries Mean RMS 800 4082. 205.5

Hut 2.4.12

Hut 2.4.12 TDC counts

Events

HImean = 2538.6 LOmean = 2629.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 807.6 116.7

Hut 2.4.13 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 807.6 116.7

Hut 2.4.13

Hut 2.4.13 TDC counts

Events

HImean = 3796.4 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1067. 1.993

Hut 2.4.14 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1067. 1.993

Hut 2.4.14

Hut 2.4.14 TDC counts

Events

HImean = 3711.5 LOmean = 3570.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1139. 112.3

Hut 2.5.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1139. 112.3

Hut 2.5.3

Hut 2.5.3 TDC counts

Events

HImean = 3429.2 LOmean = 3463.4

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1331. 103.1

Hut 2.5.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1331. 103.1

Hut 2.5.4

Hut 2.5.4 TDC counts

Events

HImean = 3445.9 LOmean = 3456.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1129. 3.443

Hut 2.5.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1129. 3.443

Hut 2.5.5

Hut 2.5.5 TDC counts

Events

HImean = 3308.9 LOmean = 1350.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1158. 147.1

Hut 2.5.6 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1158. 147.1

Hut 2.5.6

Hut 2.5.6 TDC counts

Events

HImean = 3607.9 LOmean = 1244.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1158. 113.1

Hut 2.5.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1158. 113.1

Hut 2.5.7

Hut 2.5.7 TDC counts

Events

HImean = 3297.5 LOmean = 1014.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1070. 4.035

Hut 2.5.8 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1070. 4.035

Hut 2.5.8

Hut 2.5.8 TDC counts

Events

HImean = 3294.8 LOmean = 1251.3

LP calibrations Calib 8556.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2172. 1193.

Hut 2.5.9 TDC counts

Events

-1

0

1

2150 2200 2250

Entries Mean RMS 800 2172. 1193.

Hut 2.5.9

Hut 2.5.9 TDC counts

Events

HImean = 3323.7 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 753.6 168.9

Hut 2.5.10 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 753.6 168.9

Hut 2.5.10

Hut 2.5.10 TDC counts

Events

HImean = 935.8 LOmean = 1253.0

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1375. 3.743

Hut 2.6.3 TDC counts

Events

0 50 100

1350 1400 1450

Entries Mean RMS 800 1375. 3.743

Hut 2.6.3

Hut 2.6.3 TDC counts

Events

HImean = 3402.8 LOmean = 1253.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 876.5 259.0

Hut 2.6.4 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 876.5 259.0

Hut 2.6.4

Hut 2.6.4 TDC counts

Events

HImean = 3322.2 LOmean = 1536.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1068. 109.1

Hut 2.6.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1068. 109.1

Hut 2.6.5

Hut 2.6.5 TDC counts

Events

HImean = 3247.4 LOmean = 1049.3

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1028. 153.6

Hut 2.6.6 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1028. 153.6

Hut 2.6.6

Hut 2.6.6 TDC counts

Events

HImean = 3194.1 LOmean = 1102.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1175. 1.865

Hut 2.6.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1175. 1.865

Hut 2.6.7

Hut 2.6.7 TDC counts

Events

HImean = 3442.7 LOmean = 1171.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1240. 101.7

Hut 2.6.8 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1240. 101.7

Hut 2.6.8

Hut 2.6.8 TDC counts

Events

HImean = 3477.7 LOmean = 1164.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1112. 1.806

Hut 2.6.9 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1112. 1.806

Hut 2.6.9

Hut 2.6.9 TDC counts

Events

HImean = 3186.4 LOmean = 1229.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1639. 86.94

Hut 2.6.10 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1639. 86.94

Hut 2.6.10

Hut 2.6.10 TDC counts

Events

HImean = 1188.5 LOmean = 1432.2

LP calibrations Calib 8556.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1116. 238.0

Hut 2.6.13 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1116. 238.0

Hut 2.6.13

Hut 2.6.13 TDC counts

Events

HImean = 3693.5 LOmean = 2972.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 862.6 1.915

Hut 2.6.14 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 862.6 1.915

Hut 2.6.14

Hut 2.6.14 TDC counts

Events

HImean = 3738.1 LOmean = 3949.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1434. 28.84

Hut 2.7.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1434. 28.84

Hut 2.7.3

Hut 2.7.3 TDC counts

Events

HImean = 3526.0 LOmean = 1145.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1563. 12.28

Hut 2.7.4 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1563. 12.28

Hut 2.7.4

Hut 2.7.4 TDC counts

Events

HImean = 3499.1 LOmean = 1227.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1069. 4.340

Hut 2.7.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1069. 4.340

Hut 2.7.5

Hut 2.7.5 TDC counts

Events

HImean = 3344.8 LOmean = 1142.6

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1421. 5.528

Hut 2.7.6 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1421. 5.528

Hut 2.7.6

Hut 2.7.6 TDC counts

Events

HImean = 3168.6 LOmean = 1233.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1189. 3.649

Hut 2.7.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1189. 3.649

Hut 2.7.7

Hut 2.7.7 TDC counts

Events

HImean = 3376.0 LOmean = 1223.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1586. 94.86

Hut 2.7.8 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1586. 94.86

Hut 2.7.8

Hut 2.7.8 TDC counts

Events

HImean = 3521.2 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1296. 141.7

Hut 2.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1296. 141.7

Hut 2.7.9

Hut 2.7.9 TDC counts

Events

HImean = 3417.4 LOmean = 1522.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1474. 153.5

Hut 2.7.10 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1474. 153.5

Hut 2.7.10

Hut 2.7.10 TDC counts

Events

HImean = 1110.6 LOmean = 1152.5

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 807.4 1.866

Hut 2.7.13 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 807.4 1.866

Hut 2.7.13

Hut 2.7.13 TDC counts

Events

HImean = 4058.3 LOmean = 2811.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 906.1 1.960

Hut 2.7.14 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 906.1 1.960

Hut 2.7.14

Hut 2.7.14 TDC counts

Events

HImean = 3635.3 LOmean = 2976.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1116. 2.018

Hut 2.8.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1116. 2.018

Hut 2.8.3

Hut 2.8.3 TDC counts

Events

HImean = 3417.3 LOmean = 1164.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1108. 2.108

Hut 2.8.4 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1108. 2.108

Hut 2.8.4

Hut 2.8.4 TDC counts

Events

HImean = 3366.2 LOmean = 849.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1352. 1.992

Hut 2.8.5 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1352. 1.992

Hut 2.8.5

Hut 2.8.5 TDC counts

Events

HImean = 3818.8 LOmean = 913.5

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1227. 3.974

Hut 2.8.6 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1227. 3.974

Hut 2.8.6

Hut 2.8.6 TDC counts

Events

HImean = 3450.8 LOmean = 3882.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 899.4 122.7

Hut 2.8.7 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 899.4 122.7

Hut 2.8.7

Hut 2.8.7 TDC counts

Events

HImean = 3459.3 LOmean = 1244.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1187. 102.9

Hut 2.8.8 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1187. 102.9

Hut 2.8.8

Hut 2.8.8 TDC counts

Events

HImean = 3338.0 LOmean = 1065.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1101. 183.7

Hut 2.8.9 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1101. 183.7

Hut 2.8.9

Hut 2.8.9 TDC counts

Events

HImean = 3562.5 LOmean = 1398.3

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2193. 87.27

Hut 2.8.10 TDC counts

Events

0 50 100

2150 2200 2250

Entries Mean RMS 800 2193. 87.27

Hut 2.8.10

Hut 2.8.10 TDC counts

Events

HImean = 471.1 LOmean = 647.8

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1051. 187.7

Hut 2.9.3 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1051. 187.7

Hut 2.9.3

Hut 2.9.3 TDC counts

Events

HImean = 3390.2 LOmean = 1212.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1308. 197.7

Hut 2.9.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1308. 197.7

Hut 2.9.4

Hut 2.9.4 TDC counts

Events

HImean = 3316.3 LOmean = 1134.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1126. 7.601

Hut 2.9.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1126. 7.601

Hut 2.9.5

Hut 2.9.5 TDC counts

Events

HImean = 3385.9 LOmean = 2433.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1381. 136.1

Hut 2.9.6 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1381. 136.1

Hut 2.9.6

Hut 2.9.6 TDC counts

Events

HImean = 3584.7 LOmean = 931.7

0 200 400

0 1000 2000 3000 4000

Entries Mean RMS 800 3250. 1016.

Hut 2.9.7 TDC counts

Events

0

1

3150 3200 3250

Entries Mean RMS 800 3250. 1016.

Hut 2.9.7

Hut 2.9.7 TDC counts

Events

HImean = 2581.6 LOmean = 384.5

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 968.9 5.281

Hut 2.9.8 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 968.9 5.281

Hut 2.9.8

Hut 2.9.8 TDC counts

Events

HImean = 3597.2 LOmean = 1682.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1400. 40.39

Hut 2.9.9 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1400. 40.39

Hut 2.9.9

Hut 2.9.9 TDC counts

Events

HImean = 1401.1 LOmean = 1192.0

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.4 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.4

Hut 2.10.4 TDC counts

Events

HImean = 367.4 LOmean = 438.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1018. 109.2

Hut 2.10.5 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1018. 109.2

Hut 2.10.5

Hut 2.10.5 TDC counts

Events

HImean = 1232.7 LOmean = 1246.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 897.0 3.439

Hut 2.10.6 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 897.0 3.439

Hut 2.10.6

Hut 2.10.6 TDC counts

Events

HImean = 1365.8 LOmean = 1289.6

LP calibrations Calib 8556.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1605. 1438.

Hut 2.10.7 TDC counts

Events

0

20

40

750 800 850

Entries Mean RMS 800 1605. 1438.

Hut 2.10.7

Hut 2.10.7 TDC counts

Events

HImean = 655.7 LOmean = 1055.9

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4077. 176.2

Hut 2.10.8 TDC counts

Events

0

500

4040 4060 4080 4100

Entries Mean RMS 800 4077. 176.2

Hut 2.10.8

Hut 2.10.8 TDC counts

Events

HImean = 445.4 LOmean = 389.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2087. 2.341

Hut 2.10.9 TDC counts

Events

0

100

2050 2100 2150

Entries Mean RMS 800 2087. 2.341

Hut 2.10.9

Hut 2.10.9 TDC counts

Events

HImean = 1342.9 LOmean = 1823.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1412. 1.818

Hut 2.11.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1412. 1.818

Hut 2.11.3

Hut 2.11.3 TDC counts

Events

HImean = 1309.1 LOmean = 835.4

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1223. 145.4

Hut 2.11.4 TDC counts

Events

0

100

200

1200 1250 1300

Entries Mean RMS 800 1223. 145.4

Hut 2.11.4

Hut 2.11.4 TDC counts

Events

HImean = 1311.4 LOmean = 1322.7

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 990.6 157.9

Hut 2.11.5 TDC counts

Events

0

100

950 1000 1050 1100

Entries Mean RMS 800 990.6 157.9

Hut 2.11.5

Hut 2.11.5 TDC counts

Events

HImean = 979.1 LOmean = 954.9

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 760.8 6.533

Hut 2.11.6 TDC counts

Events

0 50 100

750 800 850

Entries Mean RMS 800 760.8 6.533

Hut 2.11.6

Hut 2.11.6 TDC counts

Events

HImean = 1364.4 LOmean = 905.8

0 50 100 150

0 1000 2000 3000 4000

Entries Mean RMS 800 715.6 169.4

Hut 2.11.7 TDC counts

Events

0 50 100 150

700 750 800

Entries Mean RMS 800 715.6 169.4

Hut 2.11.7

Hut 2.11.7 TDC counts

Events

HImean = 3295.8 LOmean = 2697.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 873.4 114.0

Hut 2.11.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 873.4 114.0

Hut 2.11.8

Hut 2.11.8 TDC counts

Events

HImean = 3609.7 LOmean = 2849.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4065. 277.7

Hut 2.12.3 TDC counts

Events

0

500

4020 4040 4060 4080 4100

Entries Mean RMS 800 4065. 277.7

Hut 2.12.3

Hut 2.12.3 TDC counts

Events

HImean = 375.2 LOmean = 359.5

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 821.6 119.5

Hut 2.12.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 821.6 119.5

Hut 2.12.4

Hut 2.12.4 TDC counts

Events

HImean = 1309.3 LOmean = 1347.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 796.9 234.4

Hut 2.12.5 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 796.9 234.4

Hut 2.12.5

Hut 2.12.5 TDC counts

Events

HImean = 1345.7 LOmean = 1204.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1114. 14.79

Hut 2.12.6 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1114. 14.79

Hut 2.12.6

Hut 2.12.6 TDC counts

Events

HImean = 1166.1 LOmean = 1234.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 660.6 53.54

Hut 2.12.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 660.6 53.54

Hut 2.12.7

Hut 2.12.7 TDC counts

Events

HImean = 3929.7 LOmean = 601.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 894.3 42.11

Hut 2.12.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 894.3 42.11

Hut 2.12.8

Hut 2.12.8 TDC counts

Events

HImean = 3750.2 LOmean = 2674.9

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 825.4 233.5

Hut 2.13.3 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 825.4 233.5

Hut 2.13.3

Hut 2.13.3 TDC counts

Events

HImean = 1274.5 LOmean = 1396.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1519. 95.42

Hut 2.13.4 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1519. 95.42

Hut 2.13.4

Hut 2.13.4 TDC counts

Events

HImean = 1297.3 LOmean = 1401.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 636.6 124.8

Hut 2.13.5 TDC counts

Events

0

100

200

600 650 700

Entries Mean RMS 800 636.6 124.8

Hut 2.13.5

Hut 2.13.5 TDC counts

Events

HImean = 1339.7 LOmean = 1295.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 825.8 1.915

Hut 2.13.6 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 825.8 1.915

Hut 2.13.6

Hut 2.13.6 TDC counts

Events

HImean = 1311.5 LOmean = 1096.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1198. 29.67

Hut 2.13.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1198. 29.67

Hut 2.13.7

Hut 2.13.7 TDC counts

Events

HImean = 537.4 LOmean = 349.1

LP calibrations Calib 8556.1

0

50

0 1000 2000 3000 4000

Entries Mean RMS 800 980.3 98.50

Hut 2.13.8 TDC counts

Events

0

50

950 1000 1050

Entries Mean RMS 800 980.3 98.50

Hut 2.13.8

Hut 2.13.8 TDC counts

Events

HImean = 1148.7 LOmean = 533.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 951.7 1.997

Hut 2.14.3 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 951.7 1.997

Hut 2.14.3

Hut 2.14.3 TDC counts

Events

HImean = 1203.2 LOmean = 1217.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1050. 216.9

Hut 2.14.4 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1050. 216.9

Hut 2.14.4

Hut 2.14.4 TDC counts

Events

HImean = 1597.2 LOmean = 1776.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 892.3 16.78

Hut 2.14.5 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 892.3 16.78

Hut 2.14.5

Hut 2.14.5 TDC counts

Events

HImean = 1150.3 LOmean = 3232.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 955.5 111.1

Hut 2.14.6 TDC counts

Events

0

100

900 950 1000 1050

Entries Mean RMS 800 955.5 111.1

Hut 2.14.6

Hut 2.14.6 TDC counts

Events

HImean = 1387.6 LOmean = 1789.5

LP calibrations Calib 8556.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1188. 71.68

Hut 2.14.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1188. 71.68

Hut 2.14.7

Hut 2.14.7 TDC counts

Events

HImean = 1490.1 LOmean = 2738.2

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1156. 3.208

Hut 2.14.8 TDC counts

Events

0 50 100

1150 1200 1250

Entries Mean RMS 800 1156. 3.208

Hut 2.14.8

Hut 2.14.8 TDC counts

Events

HImean = 1139.2 LOmean = 486.1

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

8.098 / 15 P1 281.6 P2 151.7

icalid

(TDC counts)

Hut 2.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.3

Hut 2.3.3 icalid

Δfit (TDC counts)

0.164762 ns/TDCcount

0 2500

5000

10 20 30

4.945 / 14 P1 479.3 P2 155.8

icalid

(TDC counts)

Hut 2.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.4

Hut 2.3.4 icalid

Δfit (TDC counts)

0.160468 ns/TDCcount

0 2500

5000

10 20 30

8.215 / 14 P1 233.0 P2 155.6

icalid

(TDC counts)

Hut 2.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.5

Hut 2.3.5 icalid

Δfit (TDC counts)

0.160621 ns/TDCcount

0 2500

5000

10 20 30

7.410 / 14 P1 215.6 P2 151.9

icalid

(TDC counts)

Hut 2.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.6

Hut 2.3.6 icalid

Δfit (TDC counts)

0.164573 ns/TDCcount

0 2500

5000

10 20 30

16.17 / 14 P1 190.5 P2 156.9

icalid

(TDC counts)

Hut 2.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.7

Hut 2.3.7 icalid

Δfit (TDC counts)

0.159328 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

0.2828E+05/ 14 P1 344.6 P2 153.0

icalid

(TDC counts)

Hut 2.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.8

Hut 2.3.8 icalid

Δfit (TDC counts)

0.163379 ns/TDCcount

0

2000

4000

10 20 30

0.2245E+07/ 15 P1 820.5 P2 92.27

icalid

(TDC counts)

Hut 2.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.9

Hut 2.3.9 icalid

Δfit (TDC counts)

0.270938 ns/TDCcount

0 2500

5000

10 20 30

9.346 / 15 P1 441.2 P2 151.0

icalid

(TDC counts)

Hut 2.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.10

Hut 2.3.10 icalid

Δfit (TDC counts)

0.165555 ns/TDCcount

0 2000

4000

10 20 30

25.32 / 15 P1 -116.9 P2 149.6

icalid

(TDC counts)

Hut 2.3.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.11

Hut 2.3.11 icalid

Δfit (TDC counts)

0.167084 ns/TDCcount

0

2500

5000

10 20 30

13.62 / 15 P1 181.1 P2 150.5

icalid

(TDC counts)

Hut 2.3.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.12

Hut 2.3.12 icalid

Δfit (TDC counts)

0.166059 ns/TDCcount

TDC calibrations Calib 8556.1

0

2000

4000

10 20 30

0.3211E+07/ 15 P1 728.9 P2 91.47

icalid

(TDC counts)

Hut 2.3.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.13

Hut 2.3.13 icalid

Δfit (TDC counts)

0.273302 ns/TDCcount

0 2000

4000

10 20 30

24.51 / 15 P1 62.54 P2 149.0

icalid

(TDC counts)

Hut 2.3.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.14

Hut 2.3.14 icalid

Δfit (TDC counts)

0.167806 ns/TDCcount

0 2500

5000

10 20 30

19.31 / 14 P1 302.5 P2 153.8

icalid

(TDC counts)

Hut 2.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.3

Hut 2.4.3 icalid

Δfit (TDC counts)

0.162559 ns/TDCcount

0 2500

5000

10 20 30

6.556 / 14 P1 490.8 P2 158.2

icalid

(TDC counts)

Hut 2.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.4

Hut 2.4.4 icalid

Δfit (TDC counts)

0.158013 ns/TDCcount

0 2500

5000

10 20 30

4.209 / 14 P1 480.0 P2 157.7

icalid

(TDC counts)

Hut 2.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.5

Hut 2.4.5 icalid

Δfit (TDC counts)

0.158484 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

11.52 / 14 P1 501.0 P2 157.8

icalid

(TDC counts)

Hut 2.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.6

Hut 2.4.6 icalid

Δfit (TDC counts)

0.158402 ns/TDCcount

0 2500

5000

10 20 30

14.95 / 13 P1 357.2 P2 158.1

icalid

(TDC counts)

Hut 2.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.7

Hut 2.4.7 icalid

Δfit (TDC counts)

0.158147 ns/TDCcount

0 2500

5000

10 20 30

8.709 / 14 P1 297.6 P2 157.3

icalid

(TDC counts)

Hut 2.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.8

Hut 2.4.8 icalid

Δfit (TDC counts)

0.15893 ns/TDCcount

0 2000

4000

10 20 30

0.1904E+07/ 15 P1 842.4 P2 111.6

icalid

(TDC counts)

Hut 2.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.9

Hut 2.4.9 icalid

Δfit (TDC counts)

0.22403 ns/TDCcount

0

2000

4000

10 20 30

0.3535E+07/ 15 P1 696.7 P2 98.54

icalid

(TDC counts)

Hut 2.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.10

Hut 2.4.10 icalid

Δfit (TDC counts)

0.253709 ns/TDCcount

TDC calibrations Calib 8556.1

0 2000

4000

10 20 30

15.85 / 14 P1 -111.3 P2 152.3

icalid

(TDC counts)

Hut 2.4.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.11

Hut 2.4.11 icalid

Δfit (TDC counts)

0.164122 ns/TDCcount

0 2000

4000

10 20 30

26.51 / 15 P1 111.9 P2 150.2

icalid

(TDC counts)

Hut 2.4.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.12

Hut 2.4.12 icalid

Δfit (TDC counts)

0.166425 ns/TDCcount

0 2000

4000

10 20 30

29.77 / 15 P1 26.05 P2 149.7

icalid

(TDC counts)

Hut 2.4.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.13

Hut 2.4.13 icalid

Δfit (TDC counts)

0.166991 ns/TDCcount

0

2500

5000

10 20 30

13.54 / 15 P1 256.9 P2 149.9

icalid

(TDC counts)

Hut 2.4.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.14

Hut 2.4.14 icalid

Δfit (TDC counts)

0.166806 ns/TDCcount

0 2500

5000

10 20 30

0.1327E+06/ 14 P1 323.2 P2 150.8

icalid

(TDC counts)

Hut 2.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.3

Hut 2.5.3 icalid

Δfit (TDC counts)

0.165832 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

6.711 / 14 P1 469.4 P2 157.5

icalid

(TDC counts)

Hut 2.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.4

Hut 2.5.4 icalid

Δfit (TDC counts)

0.158685 ns/TDCcount

0 2500

5000

10 20 30

12.79 / 15 P1 233.1 P2 155.4

icalid

(TDC counts)

Hut 2.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.5

Hut 2.5.5 icalid

Δfit (TDC counts)

0.160896 ns/TDCcount

0

2000

4000

10 20 30

0.6830E+07/ 16 P1 1072. P2 82.17

icalid

(TDC counts)

Hut 2.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.6

Hut 2.5.6 icalid

Δfit (TDC counts)

0.304237 ns/TDCcount

0 2500

5000

10 20 30

15.30 / 14 P1 266.0 P2 154.7

icalid

(TDC counts)

Hut 2.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.7

Hut 2.5.7 icalid

Δfit (TDC counts)

0.161553 ns/TDCcount

0 2500

5000

10 20 30

0.2419E+05/ 14 P1 285.8 P2 155.8

icalid

(TDC counts)

Hut 2.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.8

Hut 2.5.8 icalid

Δfit (TDC counts)

0.160505 ns/TDCcount

TDC calibrations Calib 8556.1

0

2000

10 20 30

0.3946E+07/ 29 P1 1434. P2 26.00

icalid

(TDC counts)

Hut 2.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.9

Hut 2.5.9 icalid

Δfit (TDC counts)

0.961387 ns/TDCcount

0 2000

4000

10 20 30

21.08 / 14 P1 40.85 P2 151.1

icalid

(TDC counts)

Hut 2.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.10

Hut 2.5.10 icalid

Δfit (TDC counts)

0.165457 ns/TDCcount

0 2500

5000

10 20 30

7.104 / 14 P1 514.4 P2 152.4

icalid

(TDC counts)

Hut 2.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.3

Hut 2.6.3 icalid

Δfit (TDC counts)

0.164038 ns/TDCcount

0

2000

4000

10 20 30

0.3829E+07/ 16 P1 678.4 P2 97.99

icalid

(TDC counts)

Hut 2.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.4

Hut 2.6.4 icalid

Δfit (TDC counts)

0.255122 ns/TDCcount

0 2500

5000

10 20 30

19.50 / 15 P1 249.4 P2 153.7

icalid

(TDC counts)

Hut 2.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.5

Hut 2.6.5 icalid

Δfit (TDC counts)

0.162689 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

20.35 / 14 P1 180.1 P2 154.2

icalid

(TDC counts)

Hut 2.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.6

Hut 2.6.6 icalid

Δfit (TDC counts)

0.162179 ns/TDCcount

0 2500

5000

10 20 30

9.973 / 14 P1 331.4 P2 153.6

icalid

(TDC counts)

Hut 2.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.7

Hut 2.6.7 icalid

Δfit (TDC counts)

0.162725 ns/TDCcount

0 2500

5000

10 20 30

9.308 / 14 P1 422.7 P2 153.8

icalid

(TDC counts)

Hut 2.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.8

Hut 2.6.8 icalid

Δfit (TDC counts)

0.162498 ns/TDCcount

0 2500

5000

10 20 30

19.14 / 14 P1 358.0 P2 154.8

icalid

(TDC counts)

Hut 2.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.9

Hut 2.6.9 icalid

Δfit (TDC counts)

0.161525 ns/TDCcount

0 2500

5000

10 20 30

5.667 / 14 P1 789.1 P2 154.0

icalid

(TDC counts)

Hut 2.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.10

Hut 2.6.10 icalid

Δfit (TDC counts)

0.162355 ns/TDCcount

TDC calibrations Calib 8556.1

0

2000

4000

10 20 30

0.2781E+07/ 15 P1 1082. P2 85.16

icalid

(TDC counts)

Hut 2.6.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.13

Hut 2.6.13 icalid

Δfit (TDC counts)

0.293577 ns/TDCcount

0

2500

5000

10 20 30

23.21 / 15 P1 132.1 P2 151.1

icalid

(TDC counts)

Hut 2.6.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.14

Hut 2.6.14 icalid

Δfit (TDC counts)

0.16545 ns/TDCcount

0 2500

5000

10 20 30

9.613 / 14 P1 557.3 P2 155.5

icalid

(TDC counts)

Hut 2.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.3

Hut 2.7.3 icalid

Δfit (TDC counts)

0.16081 ns/TDCcount

0 2000

4000

10 20 30

0.4604E+07/ 15 P1 1207. P2 95.30

icalid

(TDC counts)

Hut 2.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.4

Hut 2.7.4 icalid

Δfit (TDC counts)

0.262317 ns/TDCcount

0 2000

4000

10 20 30

0.1541E+07/ 15 P1 663.8 P2 123.3

icalid

(TDC counts)

Hut 2.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.5

Hut 2.7.5 icalid

Δfit (TDC counts)

0.202733 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

8.427 / 15 P1 535.1 P2 155.6

icalid

(TDC counts)

Hut 2.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.6

Hut 2.7.6 icalid

Δfit (TDC counts)

0.160658 ns/TDCcount

0 2500

5000

10 20 30

14.84 / 14 P1 364.9 P2 156.0

icalid

(TDC counts)

Hut 2.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.7

Hut 2.7.7 icalid

Δfit (TDC counts)

0.160284 ns/TDCcount

0 2000

4000

10 20 30

0.2555E+07/ 16 P1 817.0 P2 123.6

icalid

(TDC counts)

Hut 2.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.8

Hut 2.7.8 icalid

Δfit (TDC counts)

0.202308 ns/TDCcount

0

2000

4000

10 20 30

0.5488E+07/ 16 P1 1177. P2 74.23

icalid

(TDC counts)

Hut 2.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.9

Hut 2.7.9 icalid

Δfit (TDC counts)

0.336805 ns/TDCcount

0 2000

4000

10 20 30

20.61 / 15 P1 102.8 P2 150.3

icalid

(TDC counts)

Hut 2.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.10

Hut 2.7.10 icalid

Δfit (TDC counts)

0.166307 ns/TDCcount

TDC calibrations Calib 8556.1

0 2000

4000

10 20 30

15.94 / 14 P1 81.38 P2 150.5

icalid

(TDC counts)

Hut 2.7.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.13

Hut 2.7.13 icalid

Δfit (TDC counts)

0.16608 ns/TDCcount

0 2000

4000

10 20 30

25.48 / 15 P1 5.618 P2 149.9

icalid

(TDC counts)

Hut 2.7.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.14

Hut 2.7.14 icalid

Δfit (TDC counts)

0.166737 ns/TDCcount

0 2500

5000

10 20 30

3860. / 14 P1 288.5 P2 156.1

icalid

(TDC counts)

Hut 2.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.3

Hut 2.8.3 icalid

Δfit (TDC counts)

0.160173 ns/TDCcount

0 2500

5000

10 20 30

10.60 / 15 P1 239.4 P2 153.0

icalid

(TDC counts)

Hut 2.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.4

Hut 2.8.4 icalid

Δfit (TDC counts)

0.163371 ns/TDCcount

0 2500

5000

10 20 30

6.928 / 14 P1 469.1 P2 156.8

icalid

(TDC counts)

Hut 2.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.5

Hut 2.8.5 icalid

Δfit (TDC counts)

0.159471 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

10.79 / 14 P1 360.3 P2 156.4

icalid

(TDC counts)

Hut 2.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.6

Hut 2.8.6 icalid

Δfit (TDC counts)

0.159896 ns/TDCcount

0

2500

5000

10 20 30

12.68 / 14 P1 52.66 P2 154.0

icalid

(TDC counts)

Hut 2.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.7

Hut 2.8.7 icalid

Δfit (TDC counts)

0.162363 ns/TDCcount

0 2500

5000

10 20 30

9.728 / 14 P1 491.1 P2 150.6

icalid

(TDC counts)

Hut 2.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.8

Hut 2.8.8 icalid

Δfit (TDC counts)

0.16598 ns/TDCcount

0 2500

5000

10 20 30

20.82 / 14 P1 271.3 P2 155.4

icalid

(TDC counts)

Hut 2.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.9

Hut 2.8.9 icalid

Δfit (TDC counts)

0.160901 ns/TDCcount

0

2500

5000

10 20 30

20.09 / 15 P1 160.7 P2 151.5

icalid

(TDC counts)

Hut 2.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.10

Hut 2.8.10 icalid

Δfit (TDC counts)

0.165001 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

17.13 / 14 P1 204.6 P2 155.7

icalid

(TDC counts)

Hut 2.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.3

Hut 2.9.3 icalid

Δfit (TDC counts)

0.160534 ns/TDCcount

0 2500

5000

10 20 30

9.036 / 14 P1 509.1 P2 151.0

icalid

(TDC counts)

Hut 2.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.4

Hut 2.9.4 icalid

Δfit (TDC counts)

0.165616 ns/TDCcount

0 2500

5000

10 20 30

12.85 / 15 P1 279.2 P2 152.5

icalid

(TDC counts)

Hut 2.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.5

Hut 2.9.5 icalid

Δfit (TDC counts)

0.163913 ns/TDCcount

0 2500

5000

10 20 30

14.79 / 15 P1 552.9 P2 147.2

icalid

(TDC counts)

Hut 2.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.6

Hut 2.9.6 icalid

Δfit (TDC counts)

0.169842 ns/TDCcount

0 2500

5000

10 20 30

20.01 / 14 P1 371.7 P2 154.0

icalid

(TDC counts)

Hut 2.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.7

Hut 2.9.7 icalid

Δfit (TDC counts)

0.162316 ns/TDCcount

TDC calibrations Calib 8556.1

0

2000

4000

10 20 30

0.5251E+07/ 16 P1 1176. P2 75.70

icalid

(TDC counts)

Hut 2.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.8

Hut 2.9.8 icalid

Δfit (TDC counts)

0.330253 ns/TDCcount

0 2000

4000

10 20 30

23.92 / 14 P1 -72.41 P2 150.5

icalid

(TDC counts)

Hut 2.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.9

Hut 2.9.9 icalid

Δfit (TDC counts)

0.166061 ns/TDCcount

0 2500

5000

10 20 30

12.18 / 14 P1 321.5 P2 152.4

icalid

(TDC counts)

Hut 2.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.4

Hut 2.10.4 icalid

Δfit (TDC counts)

0.164084 ns/TDCcount

0 2500

5000

10 20 30

6.854 / 15 P1 283.4 P2 150.7

icalid

(TDC counts)

Hut 2.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.5

Hut 2.10.5 icalid

Δfit (TDC counts)

0.165848 ns/TDCcount

0

2500

5000

10 20 30

19.26 / 15 P1 161.9 P2 150.8

icalid

(TDC counts)

Hut 2.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.6

Hut 2.10.6 icalid

Δfit (TDC counts)

0.165808 ns/TDCcount

TDC calibrations Calib 8556.1

0 2000

4000

10 20 30

18.18 / 15 P1 99.03 P2 150.5

icalid

(TDC counts)

Hut 2.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.7

Hut 2.10.7 icalid

Δfit (TDC counts)

0.166122 ns/TDCcount

0 2000

4000

10 20 30

14.69 / 14 P1 53.42 P2 150.5

icalid

(TDC counts)

Hut 2.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.8

Hut 2.10.8 icalid

Δfit (TDC counts)

0.166164 ns/TDCcount

0

2500

5000

10 20 30

11.37 / 14 P1 209.7 P2 151.1

icalid

(TDC counts)

Hut 2.10.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.9

Hut 2.10.9 icalid

Δfit (TDC counts)

0.165461 ns/TDCcount

0 2500

5000

10 20 30

7.429 / 14 P1 638.3 P2 155.2

icalid

(TDC counts)

Hut 2.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.3

Hut 2.11.3 icalid

Δfit (TDC counts)

0.161052 ns/TDCcount

0

2000

4000

10 20 30

0.5139E+07/ 16 P1 1128. P2 84.56

icalid

(TDC counts)

Hut 2.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.4

Hut 2.11.4 icalid

Δfit (TDC counts)

0.295644 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

10.97 / 14 P1 292.2 P2 153.3

icalid

(TDC counts)

Hut 2.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.5

Hut 2.11.5 icalid

Δfit (TDC counts)

0.163111 ns/TDCcount

0 2000

4000

10 20 30

77.71 / 17 P1 113.3 P2 132.2

icalid

(TDC counts)

Hut 2.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.6

Hut 2.11.6 icalid

Δfit (TDC counts)

0.189123 ns/TDCcount

0 2000

4000

10 20 30

23.21 / 15 P1 -16.90 P2 150.6

icalid

(TDC counts)

Hut 2.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.7

Hut 2.11.7 icalid

Δfit (TDC counts)

0.166007 ns/TDCcount

0 2000

4000

10 20 30

12.10 / 14 P1 93.73 P2 150.3

icalid

(TDC counts)

Hut 2.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.8

Hut 2.11.8 icalid

Δfit (TDC counts)

0.166359 ns/TDCcount

0 2500

5000

10 20 30

15.46 / 14 P1 224.1 P2 152.2

icalid

(TDC counts)

Hut 2.12.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.3

Hut 2.12.3 icalid

Δfit (TDC counts)

0.164219 ns/TDCcount

TDC calibrations Calib 8556.1

0 2000

4000

10 20 30

0.1339E+07/ 16 P1 452.2 P2 122.6

icalid

(TDC counts)

Hut 2.12.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.4

Hut 2.12.4 icalid

Δfit (TDC counts)

0.203965 ns/TDCcount

0 2000

4000

10 20 30

0.4012E+05/ 14 P1 78.20 P2 148.6

icalid

(TDC counts)

Hut 2.12.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.5

Hut 2.12.5 icalid

Δfit (TDC counts)

0.168222 ns/TDCcount

0 2500

5000

10 20 30

18.24 / 15 P1 387.3 P2 154.0

icalid

(TDC counts)

Hut 2.12.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.6

Hut 2.12.6 icalid

Δfit (TDC counts)

0.162389 ns/TDCcount

0 2000

4000

10 20 30

0.4665E+05/ 14 P1 -13.74 P2 144.6

icalid

(TDC counts)

Hut 2.12.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.7

Hut 2.12.7 icalid

Δfit (TDC counts)

0.172844 ns/TDCcount

0

2500

5000

10 20 30

19.88 / 15 P1 143.4 P2 150.7

icalid

(TDC counts)

Hut 2.12.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.8

Hut 2.12.8 icalid

Δfit (TDC counts)

0.165859 ns/TDCcount

TDC calibrations Calib 8556.1

0 2000

4000

10 20 30

0.1211E+06/ 14 P1 159.4 P2 144.9

icalid

(TDC counts)

Hut 2.13.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.3

Hut 2.13.3 icalid

Δfit (TDC counts)

0.17254 ns/TDCcount

0 2500

5000

10 20 30

10.23 / 14 P1 793.3 P2 154.9

icalid

(TDC counts)

Hut 2.13.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.4

Hut 2.13.4 icalid

Δfit (TDC counts)

0.161442 ns/TDCcount

0 2000

4000

10 20 30

24.36 / 14 P1 -87.56 P2 151.8

icalid

(TDC counts)

Hut 2.13.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.5

Hut 2.13.5 icalid

Δfit (TDC counts)

0.164681 ns/TDCcount

0

2500

5000

10 20 30

21.08 / 15 P1 89.62 P2 152.5

icalid

(TDC counts)

Hut 2.13.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.6

Hut 2.13.6 icalid

Δfit (TDC counts)

0.163977 ns/TDCcount

0 2500

5000

10 20 30

11.65 / 15 P1 415.6 P2 153.8

icalid

(TDC counts)

Hut 2.13.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.7

Hut 2.13.7 icalid

Δfit (TDC counts)

0.162594 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

12.72 / 14 P1 219.3 P2 153.4

icalid

(TDC counts)

Hut 2.13.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.8

Hut 2.13.8 icalid

Δfit (TDC counts)

0.162957 ns/TDCcount

0 2500

5000

10 20 30

7.233 / 15 P1 255.4 P2 152.3

icalid

(TDC counts)

Hut 2.14.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.3

Hut 2.14.3 icalid

Δfit (TDC counts)

0.164163 ns/TDCcount

0 2500

5000

10 20 30

11.94 / 15 P1 302.5 P2 151.8

icalid

(TDC counts)

Hut 2.14.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.4

Hut 2.14.4 icalid

Δfit (TDC counts)

0.164738 ns/TDCcount

0 2500

5000

10 20 30

10.38 / 14 P1 218.0 P2 151.6

icalid

(TDC counts)

Hut 2.14.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.5

Hut 2.14.5 icalid

Δfit (TDC counts)

0.164932 ns/TDCcount

0 2500

5000

10 20 30

12.22 / 15 P1 254.0 P2 152.6

icalid

(TDC counts)

Hut 2.14.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.6

Hut 2.14.6 icalid

Δfit (TDC counts)

0.163857 ns/TDCcount

TDC calibrations Calib 8556.1

0 2500

5000

10 20 30

8.133 / 14 P1 504.2 P2 154.2

icalid

(TDC counts)

Hut 2.14.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.7

Hut 2.14.7 icalid

Δfit (TDC counts)

0.162177 ns/TDCcount

0 2500

5000

10 20 30

8.078 / 14 P1 445.8 P2 153.7

icalid

(TDC counts)

Hut 2.14.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.8

Hut 2.14.8 icalid

Δfit (TDC counts)

0.162624 ns/TDCcount